This is a demonstration version of the
Network General Token Ring Sniffer (tm).

It shows many of the features of the real
product, but has the following limitations:

þ It cannot capture data from the network.
þ The buffer space is limited to 16K.
þ There are no optional Protocol Interpreters.
þ Depending on your computer equipment,
  performance and use of the display may
  be degraded.

How best to use this demonstration:

You can either use the Sniffer to follow
along with the manual, or just experiment.

The best way to start is to pick a playback
file (in the "Capture" menu "From" item).

Then start "Capture" to play it back,
and "Display" to view the data.

How to order:


      Orders for the Sniffer should be directed to

             Network General Corporation
             1296 Lawrence Station Road
               Sunnyvale, CA 94089
 
                 (408) 734-0464

